30 June 2003 [~public/geodesy/stations/cencalif/chalone]

STATION DESCRIPTION

NETWORK:Coalinga COUNTY:MONTEREY/SAN BENITO

STATION CODE: CHLN QUAD:N CHALONE PEAK, CA 7.5’

STAMPING:CHALONE NO 4 1951

TYPE:Disk SET BY:USCGS

CENTER MARK:A arrow with a dot on it.

COORDINATES: 36.44750°N, 121.19444°W PID:GU3651

36°26’51.0" 121°11’40.0"

GENERAL LOCATION: Within the Pinnacles National Monument to a Greenfield, 7 miles E of Soledad, on the summit of N Chalone Peak, on the S edge of the road and SSE of the lookout tower.

TO-REACH ROUTE DESCRIPTION: From Soledad follow signs leading to Pinnacles National Monument to a side road right, on the SW 1/4 of the NW 1/4 of section 9, T17S, R7E, (see N Chalone Peak 7.5’ Quadrangle), follow main traveled road generally SE to the LOT and the station as described.

STATION MARK DESCRIPTION: The station mark is a standard reference disk stamped CHALONE NO 4 1951, set in a drill hole in a rock outcrop projecting about 3 inches. It is 40.1 feet southeast of the southeast corner of the lookout house and about 3 feet lower in elevation than chalone 1944.

Reference mark 3 is a standard disk stamped CHALONE NO 3 1951, set in a drill hole in a rock outcrop projecting about 2 feet. It is 73.5 feet south-southeast of the southwest corner of the lookout house and about 5 feet lower in elevation than CHALONE 1944.

triangulation station CHALONE 1944 is a standard disk stamped chalone 1944, set in the top of a square concrete post projecting 4 inches. It is 11.6 feet southeast of the southwest corner of the lookout house.

ACCESS NOTES (KEYS etc): Contact Ca Division of Forestry in King City for key to locked gates, or National Park Service at 408-389-4578 (Headquarters on E side) or National Park Service at 408-389-4526 (Chaparral Station on W side). 1998 contact at National Park Service: Chad More (831) 389-4485 ext 246.

MISCELLANEOUS INFORMATION: Landed on peak in 1998. Tight landing between propane tank and power lines.

REFERENCE MARKS:

Name Distance (m) Azimuth (deg) CHALONE RM 3 22.392 218.92 CHALONE 14.695 275.88

- 1 -