30 June 2003 [~public/geodesy/stations/cencalif/russell]

STATION DESCRIPTION

NETWORK:Benito COUNTY:FRESNO

STATION CODE: RUSL QUAD:HAMMONDS RANCH, CA

STAMPING:RUSSELL 1943 1962

TYPE:Disk SET BY:USCGS

CENTER MARK:

COORDINATES: 36.77827°N, 120.67454°W PID: AA8977

36°46’41.8" 120°40’28.3"

GENERAL LOCATION: Is about 13 miles W and 5 miles S of Firebaugh and 8 miles S of Oro Loma.

TO-REACH ROUTE DESCRIPTION: From the intersection of 12th and N Streets in Firebaugh go W on Nees Avenue for 11 miles to Russell Avenue. Turn left and go S on Russell Avenue for 5.1 miles to Shields Avenue. Turn right and go W on Shields Avenue for 1.05 mi to the station on the right, about 200 feet W of a canal.

STATION MARK DESCRIPTION: The station mark is a standard disk stamped RUSSELL 1943 1962 set in a 1-1/2 by 1 foot irregular mass of concrete 2-1/2 feet below the ground surface. It is 32.4 feet north of the centerline of Shields Avenue, 3.6 feet north of a witness post, 130.8 feet west of the centerline of a dirt road and 56.5 feet east of a telephone line pole having a triangular blaze on the east side.

Reference mark 4 is a standard disk stamped RUSSELL NO 4 1943 set in the top of 12 by 12 inch concrete post projecting 6 inches. It is 2 feet west of a powerline pole and 27.3 feet south of the Avenue.

ACCESS NOTES (KEYS etc):

MISCELLANEOUS INFORMATION: Not observed in 1982. Not surveyed in 1998.

Dockter 1998 note: low priority; did not visit.

- 1 -