30 June 2003 [~public/geodesy/stations/cencalif/sanbenito]

STATION DESCRIPTION

NETWORK:Benito COUNTY:SAN BENITO

STATION CODE: SBEN QUAD:SAN BENITO MTN, CA

STAMPING:SAN BENITO 1931

TYPE:Disk SET BY:USCGS

CENTER MARK:

COORDINATES: 36.36973°N, 120.64356°W PID:GU3500

36°22’11.0" 120°38’367.8"

GENERAL LOCATION: 5 miles S of Idria.

TO-REACH ROUTE DESCRIPTION: Starting from intersection with Coalinga Road, take Clear Creek Road NE 10.60 miles to signed right turn for San Benito Mountain. Note: There are lots of turns and road can be confusing. Follow signs to New Idria until mile 10.60. Take right, continue 4 miles to turnoff right to peak. Take right, continue 1.15 miles to second microwave tower, end of truck travel and station on rocky outcrop.

STATION MARK DESCRIPTION: The station mark is a standard disk stamped SAN BENITO 1931, cemented in a drill hole in a 20 x 20 foot rock outcrop about 10 feet high. It is 19.6 feet north of the northwest corner of a small tin building. Reference mark 2 is a standard disk stamped SAN BENITO NO 2 1931, cemented in a drill hole in a 3 x 6 foot rock outcrop about 8 feet lower than the station.

Reference mark 3 is a U.S. Army Corps of Engineers disk stamped SAN BENITO R.M. 3 TPC 1971, cemented in a drill hole in a 3 x 6 foot rock outcrop that projects about 4 feet above the ground surface. It is about 10 feet lower than the station.

ACCESS NOTES (KEYS etc): Station owner: USA Gate owner: No gates.

MISCELLANEOUS INFORMATION: Drove to mark in 1998. Helicopter landing looked difficult; lots of rocks, trees, towers and power lines. Landing possible.

REFERENCE MARKS:

Name Distance (m) Azimuth (deg) SAN BENITO RM 2 20.580 69.58 SAN BENITO RM 3 14.095 321.63

- 1 -