30 June 2003 [~public/geodesy/stations/cencalif/stubble]

STATION DESCRIPTION

NETWORK:Benito COUNTY:FRESNO

STATION CODE: SBBL QUAD:CHANEY RANCH, CA

STAMPING:STUBBLE 2 1962

TYPE:Disk SET BY:USCGS

CENTER MARK:

COORDINATES: 36.69167°N, 120.56675°W PID:GU3542

36°41’30.0" 120°34’00.3"

GENERAL LOCATION: Is on the E side of Fairfax Avenue, about 11 miles SW of Mendota, 12-1/2 miles SSW of Firebaugh and 17-1/2 miles NW of Tranquility. On property owned by the Employees Enterprise Ranch.

TO-REACH ROUTE DESCRIPTION: From the jct of State Hwys 180 and 33 in Mendota, go S on State Hwy 33 for 0.75 mi to the intersection of Belmont Avenue. Turn right, W on Belmont Avenue for 10 miles to the intersection of Fairfax Avenue. Turn left, S on Fairfax Avenue for 3.5 miles to a grain storage tank on the left. Continue S on Fairfax Avenue for 0.3 mi to the station on the left. Continue S on Fairfax Avenue for 0.55 mi to the azimuth mark on the left.

STATION MARK DESCRIPTION: Station surface mark is buried 18 inches: a standard brass tablet on a 12 in concrete monument. (NB: since the USGS names this site REBAR in 1982, it may be that the mark was destroyed, in part).

R.M. 1 is southwest of station: a standard brass tablet on a 12 in concrete post up 4 in - stamped STUBBLE NO 1 1962.

ACCESS NOTES (KEYS etc): Station owner: County property Gate owner: No gate.

MISCELLANEOUS INFORMATION: Not surveyed in 1998. Mark also not found.

REFERENCE MARKS:

Name Distance (m) Azimuth (deg) STUBBLE 2 RM 1 27.167 213.92

Dockter 1998 note: Coule not find main mark in Aug. 1998. Appears to have been graded away. Found RM #1. RM directly under power three-phase residential power lines and five feet from power pole.

- 1 -